Title: 20220913 Talking about change
Course: Course Log Kasperskygroup148 2022

  Download onto your tablet or print the following pdf for our next lesson.
Speak Out Upper Intermediate
pg 57 ex 4 practice
speak_out_upper_intermediate_students_book_pg56-8-136-7_worst_inventions_articles_w_key.pdf

Optional homework
  Download onto your tablet or print the following pdf for our next lesson.
English Grammar in Use - Intermediate by Murphy, Cambridge University Press
Unit 77 78 79 articles
 pg 154-159
Complete exercises
 Check your answers with the key at the end of the file
english_grammar_in_use_intermediate_3rd_ed_murphy_cambridge_unit77-78-79_articles_w_key.pdf


 Zoom meeting details
Meeting ID: 778 8235 9654
Passcode: U2c0NY
https://us04web.zoom.us/j/77882359654?pwd=Z1wzzFd3uOFuD1uWdM6TwkSMhYtbZT.1