Title: Course Log Nzhuchkov 2025

20250402tbc Training & development
  Training & development
  Vocabulary
  Learning on the job
  Coursebook material
  Vocabulary
  Delayed error correction
20250219 Writing a company's news blog
  Writing a company's news blog
  Vocabulary
  Delayed error correction
20250212 Self presentation
  Self presentation
  Tips for a memorable self introduction
  Delayed error correction
20250205 Introducing yourself to a new project team
  Unit 1.4 Presenting yourself
  (untitled)
  Delayed error correction
20250129 Building trust
  Choosing the best candidate for leading a new project
  Unit 1.4 Presenting yourself
  Unit 1.4 Presenting yourself
  Vocabulary
  Delayed error correction